%%% lorem.tex --- 
%% 
%% Filename: lorem.tex
%% Description: 
%% Author: Ola Leifler
%% Maintainer: 
%% Created: Wed Nov 10 09:59:23 2010 (CET)
%% Version: $Id$
%% Version: 
%% Last-Updated: Wed Nov 10 09:59:47 2010 (CET)
%%           By: Ola Leifler
%%     Update #: 2
%% URL: 
%% Keywords: 
%% Compatibility: 
%% 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% 
%%% Commentary: 
%% 
%% 
%% 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% 
%%% Change log:
%% 
%% 
%% RCS $Log$
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% 
%%% Code:
% !TeX root = main.tex

\chapter{Conclusion}
\label{cha:conclusion}

%%%%%%%%%%%%%%%%%%%%%%%
\squareit{
This chapter contains a summarization of the purpose and the research
questions. To what extent has the aim been achieved, and what are the
answers to the research questions?

The consequences for the target audience (and possibly for researchers
and practitioners) must also be described. 

Besvara frågeställningen}

The main goal of this thesis was to examine the potential of resusing old test equipment with newer standards and how to assure that the results are reliable. A method to verify the test equipment according to the latest standard was suggested in this thesis and some considerations for automating this procedure was made.

\todo[Lägg in fin lista med svar på research questions här]

%%%%%%%%%%%%%%%%%%%%%%%
\section{Future work}
\squareit{
There should be a section
on future work where ideas for continued work are described. If the
conclusion chapter contains such a section, the ideas described
therein must be concrete and well thought through.

Sätt av ett kort kapitel sist i rapporten till att avrunda och föreslå rikningar för framtida utveckling av arbetet.}

Measurement errors

Mathematial analysis

Automation

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%% lorem.tex ends here

%%% Local Variables: 
%%% mode: latex
%%% TeX-master: "demothesis"
%%% End: 
