\chapter{Avslutande kommentarer}\label{cha:conclusions}
%
Sätt av ett kort kapitel sist i rapporten till att avrunda och föreslå rikningar för framtida utveckling av arbetet.

It was suprisingly difficult to find and choose apropriate components for the dummy load. The resistors had to tolerate extreme surges and the relays had to have high insulation voltages between the contacts.
