\chapter{Theory}\label{cha:theory}

This chapter contains all the necessary theory.

\section{Test pulses}

\section{Measurement}
Bra böcker

High frequency content

Measurement \& Instrumentation Principles, Alan S Morris

High-Voltage Engineering and Testing, 3rd Edition, 
Chapter 15 - Basic Measuring Techniques

Handbook of Measuring System Design, Peter H Sydenham and Richard Thorn



\textbf{Artiklar om högspänningsmätning}

High Voltage Measurements Using Slab Coupled 
Optical Sensors (SCOS) 
LeGrand Shumway, Nikola Stan, Freddy Seng, Rex King, 
Richard Selfridge, Stephen Schultz  
Department of Electrical \& Computer Engineering, Brigham Young University, Provo, Utah 84602, USA 

High frequency high voltage probe embedded 
into an extremely low inductivity high voltage 
supply connection 
D. Ketel, H. Hirsch, M. Malek 
University of Duisburg-Essen, Bi
smarckstr. 81, 47057 Duisburg, Germany, http://www.ets.uni-due.de 
Tel: +49(0) 203 379 3789, email: daniel.ketel@uni-due.de 

Optical measurement of current and voltage on power systems
AJ. Rogers

Application of the Pockels Effect to High Voltage 
Measurement
Fei Long Jianhuan  Zhang   Chunrong  Xie      Zhiwei  Yuan    
Mechanical Electrical Engineering Department, Xiamen University, Xiamen, 361005 China


\textbf{Artiklar om }



----




\section{High Voltage}

\section{RF Attenuators}
Linearity, tolerances, power, combinations of resistors, impedances

\section{Maximum ratings}
Resistors, Power, Voltages, surges

Relays, isolation, dielectric strength

\section{GPIB}
Paralell bla bla.\todo[Lägg till stuff]

