\addto{\captionsenglish}{%
  \renewcommand*\paperaffiliation{Dept.~of Electrical Engineering,\\
  Linköping University,\\ SE--581 83 Linköping, Sweden}
  \renewcommand{\paperedited}[1]{\textit{Edited version of the paper:}
    \begin{quotation}
      \noindent\nocite{#1}\backrefparscanfalse\bibentry{#1}.\backrefparscantrue
    \end{quotation}}
  \renewcommand{\paperprelver}[1]{\textit{Preliminary version:}
    \begin{quotation}
      \noindent Technical Report LiTH-ISY-R-#1, Dept.~of Electrical Engineering, Linköping University, SE-581 83 Linköping, Sweden.
    \end{quotation}}
  \renewcommand{\papertechrep}[1]{\textit{Published as:}
    \begin{quotation}
      \noindent Technical Report LiTH-ISY-R-#1, Dept.~of Electrical Engineering, Linköping University, SE-581 83 Linköping, Sweden.
    \end{quotation}}
}
\addto{\captionsswedish}{%
  \renewcommand*\paperaffiliation{Institutionen för Systemteknik,\\
  Linköpings universitet,\\ 581 83 Linköping}
  \renewcommand{\paperedited}[1]{\textit{Editerad version av publikationen:}
    \begin{quotation}
      \noindent\nocite{#1}\backrefparscanfalse\bibentry{#1}.\backrefparscantrue
    \end{quotation}}
  \renewcommand{\paperprelver}[1]{\textit{Preliminär version:}
    \begin{quotation}
      \noindent Publicerad som Teknisk rapport LiTH-ISY-R-#1, Institutionen för Systemteknik, Linköpings universitet, 581 83 Linköping.
    \end{quotation}}
  \renewcommand{\papertechrep}[1]{\textit{Publicerad som:}
    \begin{quotation}
      \noindent Teknisk rapport LiTH-ISY-R-#1, Institutionen för Systemteknik, Linköpings universitet, 581 83 Linköping.
    \end{quotation}}
}
